Control Theory with Applications to AcceleratorsJohn D. Fox and Haitham HindiStanford Linear Accelerator Center Our talk attempted to serve as an introduction to important concepts of modern control theory; it wastutorial in nature. The following references should be interesting to those who want to expand theirunderstanding of modern control theory concepts.(1) Franklin, Powell, Naeini, "Feedback Control of Dynamic Systems,’’ Addison Wesley(2) Franklin, Powell, Workman, "Digital Control of Dynamic Systems,’’ Addison Wesley(3) Kailath, "Linear Sytems,’’ Prentice Hall(4) Kailath, "Lectures on Wiener and Kalman Filtering’’, Springer Verlag(5) Bertsekas, "Dynamic Prigramming,’’ Prentice Hall(6) Meditch, "Optimal Linear Filtering and Stochastic Control,’’ Prentice Hall(7) Hindi, "Control Theory with Application to Accelerators,’’ lecture notes, US Particle AcceleratorSchool, Duke University, January 1994.